X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/kivitendo-erp.git/blobdiff_plain/3845e786001e973d0f2f49a8febf35c52ffae2b0..1f0d7da266e23a443c47aaa2dbab844e6be50ee4:/sql/Pg-upgrade2-auth/remove_insecurely_hashed_passwords.sql

diff --git a/sql/Pg-upgrade2-auth/remove_insecurely_hashed_passwords.sql b/sql/Pg-upgrade2-auth/remove_insecurely_hashed_passwords.sql
index 8a75228bf..1ea6b449b 100644
--- a/sql/Pg-upgrade2-auth/remove_insecurely_hashed_passwords.sql
+++ b/sql/Pg-upgrade2-auth/remove_insecurely_hashed_passwords.sql
@@ -1,7 +1,6 @@
 -- @tag: remove_insecurely_hashed_passwords
 -- @description: PasswÃ¶rter lÃ¶schen, die mit unsicheren Hash-Verfahren gehasht wurden
 -- @depends: release_3_3_0
--- @charset: utf-8
 UPDATE auth.user
 SET password = '*'
 WHERE (password IS NOT NULL)
