X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/kivitendo-erp.git/blobdiff_plain/deb4d2dbb676d7d6f69dfe7815d6e0cb09bd4a44..53593baa211863fbf66540cf1bcc36c8fb37257f:/sql/Pg-upgrade2/alter_default_shipped_qty.sql

diff --git a/sql/Pg-upgrade2/alter_default_shipped_qty.sql b/sql/Pg-upgrade2/alter_default_shipped_qty.sql
new file mode 100644
index 000000000..f1af95587
--- /dev/null
+++ b/sql/Pg-upgrade2/alter_default_shipped_qty.sql
@@ -0,0 +1,6 @@
+-- @tag: alter_default_shipped_qty_config
+-- @description: Mandantenweite Konfiguration fÃ¼r das Verhalten von Liefermengenabgleich
+-- @depends: release_3_5_6
+UPDATE defaults SET shipped_qty_fill_up = 'f';
+
+
