X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/kivitendo-erp.git/blobdiff_plain/deb4d2dbb676d7d6f69dfe7815d6e0cb09bd4a44..53593baa211863fbf66540cf1bcc36c8fb37257f:/sql/Pg-upgrade2/defaults_filemanagement_remove_doc_database.sql

diff --git a/sql/Pg-upgrade2/defaults_filemanagement_remove_doc_database.sql b/sql/Pg-upgrade2/defaults_filemanagement_remove_doc_database.sql
new file mode 100644
index 000000000..4d5411999
--- /dev/null
+++ b/sql/Pg-upgrade2/defaults_filemanagement_remove_doc_database.sql
@@ -0,0 +1,5 @@
+-- @tag: defaults_filemanagement_remove_doc_database
+-- @description: "Unbenutze Spalte fÃ¼r Dateimanagement-Speichertyp Datenbank entfernen"
+-- @depends: filemanagement_feature
+
+ALTER TABLE defaults DROP COLUMN doc_database;
