X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/1b15807093421ca00493a447048b960f2f512152..c4f903975358f75bd6314c2cc5a1b41b4b2a5fa7:/sql/Pg-upgrade2/remove_obsolete_trigger.sql

diff --git a/sql/Pg-upgrade2/remove_obsolete_trigger.sql b/sql/Pg-upgrade2/remove_obsolete_trigger.sql
index db802386d..796573065 100644
--- a/sql/Pg-upgrade2/remove_obsolete_trigger.sql
+++ b/sql/Pg-upgrade2/remove_obsolete_trigger.sql
@@ -1,7 +1,5 @@
 -- @tag: remove_obsolete_trigger
 -- @description: Entfernt veraltete Trigger check_inventory
--- @depends: release_3_2_0
--- @encoding: utf-8
 
 -- drop triggers
 DROP TRIGGER IF EXISTS check_inventory           ON oe;
