X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/38087e58306d822c917a765f3d5790a4720ec673..72ad92fd:/templates/German-statement.tex

diff --git a/templates/German-statement.tex b/templates/German-statement.tex
index 80af31aa5..f2d0e496f 100644
--- a/templates/German-statement.tex
+++ b/templates/German-statement.tex
@@ -1,7 +1,7 @@
 \documentclass[twoside]{scrartcl}
 \usepackage[frame]{xy}
 \usepackage{tabularx}
-\usepackage[latin1]{inputenc}
+\usepackage[utf8]{inputenc}
 \setlength{\voffset}{0.5cm}
 \setlength{\hoffset}{-2.0cm}
 \setlength{\topmargin}{0cm}
