X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/4ad83535d690476c4d279eb57741612835a3bc60..377b705324a4c43ef21b838d4ea9d474132cf16f:/sql/Pg-upgrade2/drop_audittrail.sql

diff --git a/sql/Pg-upgrade2/drop_audittrail.sql b/sql/Pg-upgrade2/drop_audittrail.sql
deleted file mode 100644
index b998dc690..000000000
--- a/sql/Pg-upgrade2/drop_audittrail.sql
+++ /dev/null
@@ -1,6 +0,0 @@
--- @tag: drop_audittrail
--- @description: Tabelle audittrail wird nicht mehr benutzt
--- @depends: release_3_0_0
--- @ignore: 0
-ALTER TABLE defaults DROP COLUMN audittrail;
-DROP TABLE audittrail;
