X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/4b26e2437f1ea0d13980a1847cbfbfbd133cae2f..177cb111a3514218b8bd7c9221f7b90ce2bdac7e:/sql/Pg-upgrade2/csv_import_profiles_2.sql

diff --git a/sql/Pg-upgrade2/csv_import_profiles_2.sql b/sql/Pg-upgrade2/csv_import_profiles_2.sql
index efe2dd46f..2d9183f19 100644
--- a/sql/Pg-upgrade2/csv_import_profiles_2.sql
+++ b/sql/Pg-upgrade2/csv_import_profiles_2.sql
@@ -1,6 +1,5 @@
 -- @tag: csv_import_profiles_2
 -- @description: Tempflag in CSV-Import-Profilen
 -- @depends: csv_import_profiles
--- @charset: utf-8
 
 ALTER TABLE csv_import_profiles ADD COLUMN login TEXT;
