X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/57d97e2ba47a46a15a71b1fcbdd4d26bfc5205a3..c2f401aae1c01aa1a85c4d3f59a4eb02803b6093:/sql/Pg-upgrade2/project_bob_attributes_itime_default_fix.sql

diff --git a/sql/Pg-upgrade2/project_bob_attributes_itime_default_fix.sql b/sql/Pg-upgrade2/project_bob_attributes_itime_default_fix.sql
index 190254ba1..f048999ab 100644
--- a/sql/Pg-upgrade2/project_bob_attributes_itime_default_fix.sql
+++ b/sql/Pg-upgrade2/project_bob_attributes_itime_default_fix.sql
@@ -1,6 +1,6 @@
 -- @tag: project_bob_attributes_itime_default_fix
 -- @description: Standardwert fÃ¼r 'itime'-Spalten in Bob-Tabellen fixen
--- @depends: release_3_0_0
+-- @depends: project_bob_attributes
 
 ALTER TABLE project                    ALTER COLUMN itime SET DEFAULT now();
 ALTER TABLE project_status             ALTER COLUMN itime SET DEFAULT now();
