X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/5931bb01914a73d37c0cb415ff8809f0c720c666..871a70f0615e1b551ff89df27ad3111a53a6f47d:/sql/Pg-upgrade2-auth/remove_menustyle_v4.sql

diff --git a/sql/Pg-upgrade2-auth/remove_menustyle_v4.sql b/sql/Pg-upgrade2-auth/remove_menustyle_v4.sql
new file mode 100644
index 000000000..3744bd326
--- /dev/null
+++ b/sql/Pg-upgrade2-auth/remove_menustyle_v4.sql
@@ -0,0 +1,8 @@
+-- @tag: remove_menustyle_v4
+-- @description: MenÃ¼typ "CSS (oben, neu)" wurde entfernt; also durch v3 ersetzen
+-- @depends:
+-- @charset: utf-8
+UPDATE auth.user_config
+SET cfg_value = 'v3'
+WHERE ((cfg_key   = 'menustyle')
+  AND  (cfg_value = 'v4'));
