X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/5ee95a8f01b5854ca9d5acf5d80c23dbe564c19f..6b68cf8878eab02fbfeb3c14c5136fe69716e0b3:/sql/Pg-upgrade2/custom_variables_sub_module_not_null.sql

diff --git a/sql/Pg-upgrade2/custom_variables_sub_module_not_null.sql b/sql/Pg-upgrade2/custom_variables_sub_module_not_null.sql
index feef5aa24..37d249164 100644
--- a/sql/Pg-upgrade2/custom_variables_sub_module_not_null.sql
+++ b/sql/Pg-upgrade2/custom_variables_sub_module_not_null.sql
@@ -1,6 +1,5 @@
 -- @tag: custom_variables_sub_module_not_null
 -- @description: sub_module in custom_variables auf NOT NULL Ã¤ndern.
--- @encoding: utf-8
 -- @depends: release_2_7_0
 UPDATE custom_variables SET sub_module = '' WHERE sub_module IS NULL;
 ALTER TABLE custom_variables ALTER COLUMN sub_module SET DEFAULT '';
