X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/6888c2ac829ef124a5df1eb07b564741897edf21..8c862a9fa73fb549ca2126ebdc53658547275dec:/statement.tex

diff --git a/statement.tex b/statement.tex
index 9a7133e67..c895fe886 100644
--- a/statement.tex
+++ b/statement.tex
@@ -18,8 +18,6 @@
 
 \begin{document}
 
-\ourfont
-
 \begin{minipage}[t]{8cm}
   \vspace*{1.0cm}
 
