X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/88dea78ecdb77761f71c5016ca97e53b2d55d9d3..061f4d6d32ed95055114582ede45e8387b302a53:/sql/Pg-upgrade2/defaults_add_precision.sql

diff --git a/sql/Pg-upgrade2/defaults_add_precision.sql b/sql/Pg-upgrade2/defaults_add_precision.sql
deleted file mode 100644
index 88f854cab..000000000
--- a/sql/Pg-upgrade2/defaults_add_precision.sql
+++ /dev/null
@@ -1,5 +0,0 @@
--- @tag: defaults_add_precision
--- @description: adds new column 'precision' in table defaults, used to round amounts
--- @depends: release_3_0_0
-ALTER TABLE defaults ADD COLUMN precision NUMERIC(15,5) NOT NULL DEFAULT(0.01);
-
