X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/980dc53321ae6c2d3e448b6ca2a0c7d11a65ee8c..db7ddbbe88d50488f5d1f5a09ab2d3455f614e7f:/sql/Pg-upgrade2-auth/remove_menustyle_v4.sql

diff --git a/sql/Pg-upgrade2-auth/remove_menustyle_v4.sql b/sql/Pg-upgrade2-auth/remove_menustyle_v4.sql
index 3744bd326..b4d598a83 100644
--- a/sql/Pg-upgrade2-auth/remove_menustyle_v4.sql
+++ b/sql/Pg-upgrade2-auth/remove_menustyle_v4.sql
@@ -1,7 +1,6 @@
 -- @tag: remove_menustyle_v4
 -- @description: MenÃ¼typ "CSS (oben, neu)" wurde entfernt; also durch v3 ersetzen
 -- @depends:
--- @charset: utf-8
 UPDATE auth.user_config
 SET cfg_value = 'v3'
 WHERE ((cfg_key   = 'menustyle')
