X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/a84958db229422752f7b167a6b37032197c87a9c..53593baa211863fbf66540cf1bcc36c8fb37257f:/sql/Pg-upgrade2/drop_gifi_2.sql

diff --git a/sql/Pg-upgrade2/drop_gifi_2.sql b/sql/Pg-upgrade2/drop_gifi_2.sql
index 53c2ec7fa..de4f27e2c 100644
--- a/sql/Pg-upgrade2/drop_gifi_2.sql
+++ b/sql/Pg-upgrade2/drop_gifi_2.sql
@@ -1,6 +1,5 @@
 -- @tag: drop_gifi_2
 -- @description: Spalte gifi_accno vollstÃ¤ndig entfernen
 -- @depends: release_3_0_0 drop_gifi
--- @encoding: utf-8
 
 ALTER TABLE "vendor" DROP COLUMN "gifi_accno";
