X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/b8fee3fc5f7ae08e3d431c6c2fad4add9a2d88cf..60de0703a74f40f6b49ba7f47fc2b5e54937e5d3:/sql/Pg-upgrade2/drop_dpt_trans.sql

diff --git a/sql/Pg-upgrade2/drop_dpt_trans.sql b/sql/Pg-upgrade2/drop_dpt_trans.sql
index b49909925..d2a8b5f06 100644
--- a/sql/Pg-upgrade2/drop_dpt_trans.sql
+++ b/sql/Pg-upgrade2/drop_dpt_trans.sql
@@ -1,7 +1,6 @@
 -- @tag: drop_dpt_trans
 -- @description: LÃ¶scht nicht mehr benÃ¶tigte Tabelle dpt_trans
 -- @depends: release_3_0_0
--- @charset: utf-8
 
 -- Drop table dpt_trans:
 DROP TABLE dpt_trans;
