X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/d30073296f5309bd24ef6225e18977fd711a26b8..eeb5375ee7727c956cc357cc8f90b19d1bfe80b9:/sql/Pg-upgrade2/project_defaults.sql

diff --git a/sql/Pg-upgrade2/project_defaults.sql b/sql/Pg-upgrade2/project_defaults.sql
index 1d65dc73c..f03ca9311 100644
--- a/sql/Pg-upgrade2/project_defaults.sql
+++ b/sql/Pg-upgrade2/project_defaults.sql
@@ -1,6 +1,6 @@
--- @tag: add_project_defaults 
+-- @tag: add_project_defaults
 -- @description: Standardprojekttyp und Standardprojectstatus
--- @depends: release_3_2_0
+-- @depends: release_3_3_0
 ALTER TABLE defaults ADD COLUMN order_always_project boolean DEFAULT false;
 ALTER TABLE defaults ADD COLUMN project_status_id integer;
 ALTER TABLE defaults ADD COLUMN project_type_id integer;
