X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/d319704a66e9be64da837ccea10af6774c2b0838..40d52f50:/templates/German-check.tex

diff --git a/templates/German-check.tex b/templates/German-check.tex
index ce3b56fe2..38069dc5e 100644
--- a/templates/German-check.tex
+++ b/templates/German-check.tex
@@ -10,7 +10,7 @@
 \setlength{\topskip}{0pt}
 \setlength{\oddsidemargin}{1.0cm}
 \setlength{\evensidemargin}{1.0cm}
-\setlength{\textwidth}{19.2cm}
+\setlength{\textwidth}{17cm}
 \setlength{\textheight}{24.5cm}
 \setlength{\footskip}{1cm}
 \setlength{\parindent}{0pt}
