X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/d319704a66e9be64da837ccea10af6774c2b0838..54ddc03:/templates/German-statement.tex

diff --git a/templates/German-statement.tex b/templates/German-statement.tex
index defa0374c..f2d0e496f 100644
--- a/templates/German-statement.tex
+++ b/templates/German-statement.tex
@@ -1,7 +1,7 @@
 \documentclass[twoside]{scrartcl}
 \usepackage[frame]{xy}
 \usepackage{tabularx}
-\usepackage[latin1]{inputenc}
+\usepackage[utf8]{inputenc}
 \setlength{\voffset}{0.5cm}
 \setlength{\hoffset}{-2.0cm}
 \setlength{\topmargin}{0cm}
@@ -10,14 +10,14 @@
 \setlength{\topskip}{0pt}
 \setlength{\oddsidemargin}{1.0cm}
 \setlength{\evensidemargin}{1.0cm}
-\setlength{\textwidth}{19.2cm}
+\setlength{\textwidth}{17cm}
 \setlength{\textheight}{24.5cm}
 \setlength{\footskip}{1cm}
 \setlength{\parindent}{0pt}
 \renewcommand{\baselinestretch}{1}
 \begin{document}
 
-\newlength{\descrwidth}\setlength{\descrwidth}{10cm}
+\newlength{\descrwidth}\setlength{\descrwidth}{9cm}
 
 \newsavebox{\hdr}
 \sbox{\hdr}{
