X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/d3d6cb31bbeec3a6eba3ff41990a2748303f5851..1f0d7da266e23a443c47aaa2dbab844e6be50ee4:/sql/Pg-upgrade2-auth/password_hashing.sql?ds=sidebyside

diff --git a/sql/Pg-upgrade2-auth/password_hashing.sql b/sql/Pg-upgrade2-auth/password_hashing.sql
index c1db61363..40956d098 100644
--- a/sql/Pg-upgrade2-auth/password_hashing.sql
+++ b/sql/Pg-upgrade2-auth/password_hashing.sql
@@ -1,7 +1,6 @@
 -- @tag: password_hashing
 -- @description: Explicitely set a password hashing algorithm
 -- @depends:
--- @charset: utf-8
 UPDATE auth."user"
   SET password = '{CRYPT}' || password
   WHERE NOT (password IS NULL)
