X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/d4925a8b60f04674885e30d9316dc0263f8b9a84..b293ff8ad52fc76ba0c44783e3982418114d6b08:/sql/Pg-upgrade2/defaults_order_controller.sql

diff --git a/sql/Pg-upgrade2/defaults_order_controller.sql b/sql/Pg-upgrade2/defaults_order_controller.sql
new file mode 100644
index 000000000..00517103c
--- /dev/null
+++ b/sql/Pg-upgrade2/defaults_order_controller.sql
@@ -0,0 +1,4 @@
+-- @tag: defaults_order_controller
+-- @description: Mandantenkonfiguration: Order-Controller auf aktiv setzen
+-- @depends: release_3_5_8
+UPDATE defaults SET feature_experimental_order = TRUE;
