X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/dbda14c263efd93aca3b7114015a47d86b8581e3..3774d83b865ab246d13077d24699b987a7a7aa05:/sql/Pg-upgrade2/csv_import_profiles_2.sql

diff --git a/sql/Pg-upgrade2/csv_import_profiles_2.sql b/sql/Pg-upgrade2/csv_import_profiles_2.sql
index efe2dd46f..2d9183f19 100644
--- a/sql/Pg-upgrade2/csv_import_profiles_2.sql
+++ b/sql/Pg-upgrade2/csv_import_profiles_2.sql
@@ -1,6 +1,5 @@
 -- @tag: csv_import_profiles_2
 -- @description: Tempflag in CSV-Import-Profilen
 -- @depends: csv_import_profiles
--- @charset: utf-8
 
 ALTER TABLE csv_import_profiles ADD COLUMN login TEXT;
