X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/deb4d2dbb676d7d6f69dfe7815d6e0cb09bd4a44..53593baa211863fbf66540cf1bcc36c8fb37257f:/sql/Pg-upgrade2/change_warehouse_client_config_default.sql

diff --git a/sql/Pg-upgrade2/change_warehouse_client_config_default.sql b/sql/Pg-upgrade2/change_warehouse_client_config_default.sql
new file mode 100644
index 000000000..4fbc6fe62
--- /dev/null
+++ b/sql/Pg-upgrade2/change_warehouse_client_config_default.sql
@@ -0,0 +1,4 @@
+-- @tag: change_warehouse_client_config_default
+-- @description: Konfigurations-Optionen fÃ¼r das Standard-Auslager-Verfahren zurÃ¼ckschrauben fÃ¼r negative Lagermengen
+-- @depends: release_3_5_7
+UPDATE defaults set transfer_default_ignore_onhand = 'f';
