X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/deb4d2dbb676d7d6f69dfe7815d6e0cb09bd4a44..53593baa211863fbf66540cf1bcc36c8fb37257f:/sql/Pg-upgrade2/defaults_bcc_to_login.sql

diff --git a/sql/Pg-upgrade2/defaults_bcc_to_login.sql b/sql/Pg-upgrade2/defaults_bcc_to_login.sql
new file mode 100644
index 000000000..6321fc07e
--- /dev/null
+++ b/sql/Pg-upgrade2/defaults_bcc_to_login.sql
@@ -0,0 +1,6 @@
+-- @tag: defaults_bcc_to_login
+-- @description: BCC Email zu aktuellem Benutzer
+-- @depends: defaults_global_bcc
+
+ALTER TABLE defaults ADD bcc_to_login boolean NOT NULL DEFAULT FALSE;
+
