X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/deb4d2dbb676d7d6f69dfe7815d6e0cb09bd4a44..53593baa211863fbf66540cf1bcc36c8fb37257f:/sql/Pg-upgrade2/defaults_order_controller.sql?ds=inline

diff --git a/sql/Pg-upgrade2/defaults_order_controller.sql b/sql/Pg-upgrade2/defaults_order_controller.sql
new file mode 100644
index 000000000..00517103c
--- /dev/null
+++ b/sql/Pg-upgrade2/defaults_order_controller.sql
@@ -0,0 +1,4 @@
+-- @tag: defaults_order_controller
+-- @description: Mandantenkonfiguration: Order-Controller auf aktiv setzen
+-- @depends: release_3_5_8
+UPDATE defaults SET feature_experimental_order = TRUE;
