X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/eca0862f8bcc69d22d94c41cc9076a008c77056d..728a02eb7cda5d7bda03105d6a68b8eb126928f0:/sql/Pg-upgrade2-auth/remove_menustyle_xml.sql

diff --git a/sql/Pg-upgrade2-auth/remove_menustyle_xml.sql b/sql/Pg-upgrade2-auth/remove_menustyle_xml.sql
index f1e3327bb..a8ec107cb 100644
--- a/sql/Pg-upgrade2-auth/remove_menustyle_xml.sql
+++ b/sql/Pg-upgrade2-auth/remove_menustyle_xml.sql
@@ -1,7 +1,6 @@
 -- @tag: remove_menustyle_xml
 -- @description: MenÃ¼typ "XUL/XML" wurde entfernt; also durch v3 ersetzen
 -- @depends:
--- @charset: utf-8
 UPDATE auth.user_config
 SET cfg_value = 'v3'
 WHERE ((cfg_key   = 'menustyle')
