X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/mfinanz.git/blobdiff_plain/f05bd96b031d7d4ffaf4804704684ae929a0890a..d58b1a04c2facd0a4484cf2b801b27b9741cce26:/sql/Pg-upgrade2/defaults_invoice_prevent_browser_back.sql

diff --git a/sql/Pg-upgrade2/defaults_invoice_prevent_browser_back.sql b/sql/Pg-upgrade2/defaults_invoice_prevent_browser_back.sql
new file mode 100644
index 000000000..c12e82b56
--- /dev/null
+++ b/sql/Pg-upgrade2/defaults_invoice_prevent_browser_back.sql
@@ -0,0 +1,5 @@
+-- @tag: defaults_invoice_prevent_browser_back
+-- @description: Verhinderung Browser-ZurÃ¼ck-Knopf einstellbar in Mandantenkonfiguration
+-- @depends: release_3_6_0
+
+ALTER TABLE defaults ADD COLUMN invoice_prevent_browser_back boolean NOT NULL DEFAULT FALSE;
