X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/timetracker.git/blobdiff_plain/0040233ec546afbe413861e356e26351468c4992..4af7dd7e10968588fe4c2828be5402f41d53ebc5:/mysql.sql

diff --git a/mysql.sql b/mysql.sql
index a9a88f64..bf0fb204 100644
--- a/mysql.sql
+++ b/mysql.sql
@@ -227,6 +227,7 @@ CREATE TABLE `tt_cron` (
   `next` int(11) default NULL,                  # UNIX timestamp of when to run next job
   `report_id` int(11) default NULL,             # report id from tt_fav_reports, a report to mail on schedule
   `email` varchar(100) default NULL,            # email to send results to
+  `report_condition` varchar(255) default NULL, # report condition, "count > 0" for sending not empty reports
   `status` tinyint(4) default '1',              # entry status
   PRIMARY KEY (`id`)
 );
