X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/timetracker.git/blobdiff_plain/7482d40143c40f58935fc37ecda54f2a60b2611e..496cfee4721ea6f3dca65ec57a2845ef059c5b1d:/mysql.sql

diff --git a/mysql.sql b/mysql.sql
index 931f9bdc..cc4ffb0d 100644
--- a/mysql.sql
+++ b/mysql.sql
@@ -452,4 +452,4 @@ CREATE TABLE `tt_site_config` (
   PRIMARY KEY  (`param_name`)
 );
 
-INSERT INTO `tt_site_config` (`param_name`, `param_value`, `created`) VALUES ('version_db', '1.17.64', now()); # TODO: change when structure changes.
+INSERT INTO `tt_site_config` (`param_name`, `param_value`, `created`) VALUES ('version_db', '1.17.65', now()); # TODO: change when structure changes.
