X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/timetracker.git/blobdiff_plain/8ccdc0ed79c1703162607702c6846d2c76a7a755..3eea3d000c2415bb7b36ab759a049420ca53ae2e:/mysql.sql?ds=inline

diff --git a/mysql.sql b/mysql.sql
index 4cacf9a0..ffba70f1 100644
--- a/mysql.sql
+++ b/mysql.sql
@@ -427,4 +427,4 @@ CREATE TABLE `tt_site_config` (
   PRIMARY KEY  (`param_name`)
 );
 
-INSERT INTO `tt_site_config` (`param_name`, `param_value`, `created`) VALUES ('version_db', '1.17.35', now()); # TODO: change when structure changes.
+INSERT INTO `tt_site_config` (`param_name`, `param_value`, `created`) VALUES ('version_db', '1.17.40', now()); # TODO: change when structure changes.
