X-Git-Url: http://wagnertech.de/gitweb/gitweb.cgi/timetracker.git/blobdiff_plain/ba0b5f34efabfeded3112115086eaa9d00f2a345..a8ef8ed3ff0aca2d4429b08cc7ff37bd273f4547:/mysql.sql

diff --git a/mysql.sql b/mysql.sql
index bfc198a9..d9adc6e3 100644
--- a/mysql.sql
+++ b/mysql.sql
@@ -28,7 +28,7 @@ CREATE TABLE `tt_teams` (
   `plugins` varchar(255) default NULL,                   # a list of enabled plugins for team
   `lock_spec` varchar(255) default NULL,                 # Cron specification for record locking,
                                                          # for example: "0 10 * * 1" for "weekly on Mon at 10:00".
-  `daily_working_hours` smallint(6) DEFAULT '8',         # number of working hours per days, a worker is suppose to work
+  `workday_hours` smallint(6) DEFAULT '8',               # number of work hours in a regular day
   `custom_logo` tinyint(4) default '0',                  # whether to use a custom logo or not
   `status` tinyint(4) default '1',                       # team status
   PRIMARY KEY (`id`)
